Index: branches/5.2.x/core/install/install_schema.sql
===================================================================
diff -u -r15012 -r15033
--- branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15012)
+++ branches/5.2.x/core/install/install_schema.sql	(.../install_schema.sql)	(revision 15033)
@@ -677,7 +677,6 @@
   `Status` tinyint(3) unsigned NOT NULL DEFAULT '1',
   `Event` varchar(255) NOT NULL DEFAULT '',
   RunInterval int(10) unsigned NOT NULL DEFAULT '0',
-  RunMode tinyint(3) unsigned NOT NULL DEFAULT '2',
   LastRunOn int(10) unsigned DEFAULT NULL,
   LastRunStatus tinyint(3) unsigned NOT NULL DEFAULT '1',
   NextRunOn int(11) DEFAULT NULL,
@@ -688,7 +687,6 @@
   PRIMARY KEY (ScheduledTaskId),
   KEY `Status` (`Status`),
   KEY RunInterval (RunInterval),
-  KEY RunMode (RunMode),
   KEY LastRunOn (LastRunOn),
   KEY LastRunStatus (LastRunStatus),
   KEY RunTime (RunTime),
